vert_sampling=strato_custom
vert_dzmin=0.017
vert_dzlow=0.07
vert_z0low=2.
vert_dzmid=0.8
vert_z0mid=6
vert_h_mid=2
vert_dzhig=11.
vert_z0hig=75.
vert_h_hig=20.

