vert_sampling=strato_custom
vert_scale=7.
vert_dzmin=0.017
vert_dzlow=1.
vert_z0low=8.7
vert_dzmid=2.
vert_z0mid=70.
vert_h_mid=20.
vert_dzhig=11.
vert_z0hig=75.
vert_h_hig=20.
ok_strato=n
