# Options of the 1D-simulation pour FIRE: 14-7-1987 8:00
forcing_type=50
time_ini=8.          ! indicate UTC time
rlat=33.2            ! latitude 
rlon=-119.5          ! longitude 
nat_surf=0          ! 0=ocean,1=land,2=glacier,3=banquise
tsurf=289.           ! SST (not used if type_ts_forcing=1 in lmdz1d.F)
psurf=101250.        ! surface pressure
zsurf=0.             ! surface altitude
rugos=0.0002   
wtsurf=0.0
wqsurf=0.0
albedo=0.19
agesno=50.0    
restart_runoff=0.0    
qsolinp=0.0          ! meaningless over ocean
zpicinp=0.0          ! meaningless over ocean
iflag_radia=1
# repris de config.def (MPL 20170117)
qsol0=100.
