##############################################################################
# PARAMETRES ET CLES DE LA PHYSIQUE LMDZ
##############################################################################
# D: Valeur par default
#
# Controle des sorties
#*********************
OK_journe=y
OK_mensuel=y
ok_hf=n
OK_instan=n
ok_LES=n
# A transformer en la ligne ci-dessous quand ce sera compatible avec libIGCM
phys_out_filekeysXXX       n       y       y       n       n
phys_out_filenames=      histmth histday histhf  histins histLES
phys_out_filelevels=     10      5       10       4       4
phys_out_filetypes=      ave(X)  ave(X)  inst(X) inst(X) inst(X)
phys_out_filetimesteps=  10day   1day    6hr     6hr     6hr

flag_rugs=  2, 3, 5, 5, 1


#
#Couplage avec autres modules
#******************************
#option de couplage pour ocean (D:force)
type_ocean=force
version_ocean=nemo
#avec ou sans orchidee (D:n)
#type_run=AMIP, ENSP, clim (D:AMIP)
type_run=CLIM
##  Soil Model  ou non               


# Parametres "orbitaux/ ere geologique"
#######################################
#
### R_ecc =      Excentricite
R_ecc = 0.
### R_peri =     Equinoxe
R_peri = 102.7
### R_incl =     Inclinaison
R_incl = 0.
### solarlong0 = longitude solaire
solarlong0 = 0.
### solaire =    Constante solaire
solaire = 1365.

pmagic=0.
#
# Taux gaz a effet de serre
#######################################
#
### co2_ppm =    taux CO2 en ppm
co2_ppm = 0.348E+03
### CH4_ppb =    taux CH4 en ppb
CH4_ppb = 0.1650E+04
### N2O_ppb =    taux N2O en ppb
N2O_ppb = 0.306E+03
### CFC11_ppt =  taux CFC11 en ppt
CFC11_ppt = 0.1E+01
### CFC12_ppt =  taux CFC12 en ppt
CFC12_ppt = 0.
#
# Parametres effets directs/indirects des "aerosols"
#######################################
#
### ok_ade=y/n   flag Aerosol direct effect
ok_ade=n
### ok_aie=y/n   flag Aerosol indirect effect
ok_aie=n
### aer_type =   Aerosol variation type : actuel / preind / scenario / annuel
aer_type=annuel
###  type of coupled aerosol =1 (default) =2 => bc  only =3 => pom only =4 => seasalt only =5 => dust only =6 => all aerosol
flag_aerosol=6 
### bl95_b0 =    Parameter in CDNC-maer link (Boucher&Lohmann 1995)
bl95_b0=1.7
### bl95_b1 =    Parameter in CDNC-maer link (Boucher&Lohmann 1995)
bl95_b1=0.2
#
# Parametre de lecture de l'ozone
#######################################
#
# Allowed values are 0, 1 and 2
# 0: do not read an ozone climatology
# 1: read a single ozone climatology that will be used day and night
# 2: read two ozone climatologies, the average day and night climatology and the daylight climatology
read_climoz=0
#read_climoz=0
#
# Parametres simulateur COSP (CFMIP Observational Simulator Package)
#######################################
#
### ok_cosp=y/n flag simulateur COSP
ok_cosp=n
### freq_COSP = frequence d'appel de COSP en secondes
freq_COSP=10800.
### ok_mensuelCOSP=y/n sortir fichier mensuel COSP histmthCOSP.nc, =n pas de fichier histmthCOSP.nc
ok_mensuelCOSP=y
### ok_journeCOSP=y/n sortir fichier journalier histdayCOSP.nc, =n pas de fichier histdayCOSP.nc
ok_journeCOSP=y
### ok_hfCOSP=y/n, ecrire sorties  haute frequence histhfCOSP.nc, =n pas de fichier histhfCOSP.nc
ok_hfCOSP=n
#
# Parametres simulateur ISCCP
#######################################
#
### ok_isccp=y/n flag simulateur ISCCP
ok_isccp=n
### top_height = flag choix calcul nuages par le simulateur en utilisant 
# -              les donnees IR et/ou VIS et l algorithme ISCCP-D1
# - top_height = 1 -> algo IR-VIS
# - top_height = 2 -> identique a 1, mais "ptop(ibox)=pfull(ilev)"
# - top_height = 3 -> algo IR
top_height = 1
### overlap =    Hypothese de Recouvrement (HR) utilisee pour le simulateur ISCCP
# - overlap=1    Max overlap
# - overlap=2    Random overlap
# - overlap=3    Max/Random overlap
overlap = 3
#

# Specifique aquaplanete
########################
qsol0=100.
